/GeV Tp 1 10^210

mμ/_{ϕr}σ

0 2 4 6 8 10 12 14_{GLD}

GLDPrime GLD4LDC

= 17.5 mm) min (B=3.0 T, R = 16 mm) min (B=3.5 T, R = 15 mm) min (B=4.0 T, R a)